Bromed Plus Adult Underpads

Bromed Plus Adult Underpads are high-quality, disposable pads designed to protect beds and furniture from incontinence-related moisture. Manufactured with a thick polypropylene backing and Super Absorbent Polymer (SAP), they offer an ISO absorbency of 800ml. The integral mat or bonded construction reduces top sheet separation and clumping, while the thick non-skid backing ensures the pad stays in place. Skin-friendly and latex-free, these underpads are available in sizes 40cm x 60cm, 60cm x 60cm  and 60cm x 90cm.

The post Bromed Plus Adult Underpads appeared first on GulfPhysio - UAE's Online Physiotherapy Store.