MoliCare Premium Mobile

MoliCare® Premium Mobile is a high-quality, unisex incontinence pull-up designed for individuals with moderate to very severe urinary incontinence. It offers the comfort and appearance of regular underwear while providing superior protection and skin-friendly features.

Key Features:

Underwear-like Design: Anatomically shaped with soft, textile-like materials for a discreet and comfortable fit.

Three-Layer Absorbent Core: Quickly absorbs and locks in liquids, keeping the skin dry and reducing the risk of irritation.

pH-Balanced: Maintains a skin-friendly pH of 5.5 to help prevent skin irritation.

Leakage Protection: Inner cuffs provide maximum leakage protection.

Easy Removal: Tear-open side seams allow for quick and effortless removal.

Absorbency Levels:

8 Drops: Suitable for heavy incontinence, with an absorbency of approximately 1,791–2,421 ml.

10 Drops: Designed for very heavy incontinence, offering an absorbency of approximately 2,626–2,757 ml.

The post MoliCare Premium Mobile appeared first on GulfPhysio - UAE's Online Physiotherapy Store.