Hospeen Adult Diapers

Hospeen Adult Diapers are high-absorbency pull-up style incontinence pants designed for ultimate comfort and protection. Made with soft, breathable materials and a 360° elastic waistband, they offer a snug, secure fit that feels like regular underwear. With an advanced super absorbent core that locks away moisture and a wetness indicator that signals when it’s time for a change, Hospeen diapers are ideal for both day and night use. Available in various sizes to fit men and women, they provide discreet, leak-proof protection for active adults and elderly users.

Hospeen Adult Diapers – Key Features

Absorbency: Utilizes high-quality Super Absorbent Polymer (SAP) imported from Japan, capable of holding up to 2 liters, ensuring superior absorbency and leak-proof protection.

Design: Features a 360-degree elastic waistband for a snug fit and ease of movement. The pant-style design offers discretion and comfort.

Material: Made from breathable, hypoallergenic materials, ensuring comfort for extended wear.

Wetness Indicator: Includes a wetness indicator that fades when the diaper is wet, aiding in timely changes.

Usage: Suitable for both day and night use, providing reliable protection against incontinence

The post Hospeen Adult Diapers appeared first on GulfPhysio - UAE's Online Physiotherapy Store.